0 2 4 6 8 10 12 14 16 0 20 40 60 80 100

Relative Error [%]

Satisfaction density [%] a) GEOSTROPHY @ interior V-points

PGL PGLslip PGBslip PG0 PGR PGRslip PGRW

0 10 20 30 40 50 60 70 80 90 100 0

20

40

60

80

Relative Error [%] b) SVERDRUP BALANCE @ T-points