10^{-3} 10^{-2} 10^{-1} 10^0

10^{-1}

10^0

10^1

10^2

FREQUENCY (cycle per yr)

POWER (K 2/cpy, mb 2/cpy)

Greenland Icelandic Low SLP index

Cross Gulf Stream SST index

95 %